1778114956056
19584,3.0.19
19583,3.0.18
6431,4.4.0
12,4.8.0
14,4.7.0
17805,4.5.0
18102,3.0.46
15,4.6.0
9772,3.0.42
14306,4.11.0
14863,4.11.0
8274,3.0.19
5155,3.0.36
19594,3.0.11
19597,3.0.12
24613,4.3.0
19593,3.0.10
22226,3.0.6
24512,3.0.38
24412,3.0.40
19599,3.0.13
19596,3.0.14
88,3.0.33
18224,3.0.44
20714,3.0.19
24409,3.0.42
18215,3.0.44
24415,3.0.42
1322,3.0.25
18216,3.0.44
24413,3.0.42
18217,3.0.44
24408,3.0.42
24416,3.0.42
9723,3.0.42
18222,3.0.44
4887,4.11.0
9725,3.0.42
9722,3.0.42
11770,4.4.0
19222,4.10.0
18219,3.0.42
12171,4.8.0
20913,3.0.44
10512,4.4.0
12198,3.0.7
12190,3.0.6
12191,3.0.3
12192,3.0.4
19207,3.0.38
3874,3.0.42
12195,3.0.9
13793,3.0.25
23522,4.11.0
12197,3.0.8
3339,3.0.48
12107,3.0.38
3341,3.0.46
3340,3.0.46
20594,3.0.42
18659,3.0.48
5208,3.0.19
8281,3.0.29
18516,3.0.44
18512,3.0.44
6900,4.8.0
23962,3.0.46
18514,3.0.44
18515,3.0.44
9903,3.0.36
21044,4.2.0
6,4.9.0
12563,4.7.0
11824,4.11.0
206,3.0.19
10990,4.3.0
13677,4.2.0
18205,3.0.25
4918,3.0.6
24258,3.0.38
24256,3.0.38
24260,3.0.38
24153,4.11.0
14827,4.11.0
24238,3.0.38
8071,3.0.42
11550,3.0.38
23234,3.0.41
18923,3.0.44
19084,3.0.42
19083,3.0.42
340,3.0.42
3328,3.0.48
18623,4.11.0
8545,4.11.0
18624,4.10.0
11403,4.6.0
231,3.0.6
4103,3.0.38
19645,3.0.40
4101,3.0.38
16114,3.0.38
19650,3.0.41
4105,3.0.42
9611,4.2.0
4102,3.0.41
19655,3.0.45
19652,3.0.42
24584,4.10.0
19648,3.0.43
19654,3.0.48
15958,4.7.0
19656,3.0.46
19653,3.0.47
19660,3.0.39
8014,3.0.35
21385,4.11.0
10936,3.0.38
13918,4.5.0
5203,3.0.42
19670,3.0.30
19669,3.0.33
19674,3.0.34
14396,4.11.0
19671,3.0.31
19668,3.0.32
18876,3.0.48
19673,3.0.37
19658,3.0.38
19676,3.0.35
21698,4.6.0
19672,3.0.36
17836,3.0.44
19569,3.0.28
17837,3.0.44
19567,3.0.29
13877,4.4.0
13878,4.3.0
13881,4.2.0
24247,3.0.41
7072,4.9.0
22943,3.0.48
11773,4.5.0
154,3.0.46
15639,3.0.42
19575,3.0.22
19580,3.0.23
19576,3.0.20
23644,4.9.0
19578,3.0.26
19568,3.0.27
19582,3.0.24
19577,3.0.25
